)^2c

(GeV/

-e^+em

2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

2c Entries/40 MeV/

20 40 60 80 100 120 140 160

= 26/44 dof /^2χ

= 5.02 TeV NNs ALICE p-Pb,

c > 1.3 GeV/ Tp data fit, all fit, signal fit, background